{"text_format":"dbase-jsonl-2026-09-30","columns":[{"name":"CODE","type":"character","width":254},{"name":"CODECR","type":"character","width":254},{"name":"PRODUCT","type":"character","width":254},{"name":"PRODUCER","type":"character","width":254},{"name":"REJECTED","type":"number","width":19,"decimals":0},{"name":"ORDERED","type":"number","width":19,"decimals":0},{"name":"ORDERID","type":"number","width":19,"decimals":0},{"name":"OLINEID","type":"number","width":19,"decimals":0}],"n_rows":1,"rows_kept":1,"cut":false,"deleted_skipped":0,"read_ended":"whole","bounds":"16MiB/16384/4096/first_that_fit","version":"dbase_level_three","encoding_class":"enc_absent","reader":"statdb_count/12"}
["8748518","5841","\u0096¥à¥¡à®«¨§¨­ 2¬« ü10  ¬¯.","EVER Neuro Pharma, GmbH",1,10,89455487954,1035737754]